import type { Metadata } from 'next';

export const metadata: Metadata = {
  title: 'Technical Specifications - CHORUS Services',
  description: 'Comprehensive technical documentation, system requirements, API specifications, and deployment guides for CHORUS Services distributed AI orchestration platform.',
  keywords: [
    'technical specifications',
    'system requirements',
    'API documentation',
    'deployment guide',
    'enterprise features',
    'performance metrics',
    'CHORUS Services',
    'distributed AI',
    'infrastructure requirements',
    'scalability',
    'security specifications',
    'integration documentation'
  ],
  openGraph: {
    title: 'Technical Specifications - CHORUS Services',
    description: 'Complete technical reference for enterprise decision makers and system architects implementing CHORUS Services.',
    type: 'website',
    images: [
      {
        url: '/technical-specs-og.png',
        width: 1200,
        height: 630,
        alt: 'CHORUS Services Technical Specifications',
      },
    ],
  },
  twitter: {
    card: 'summary_large_image',
    title: 'Technical Specifications - CHORUS Services',
    description: 'Complete technical reference for enterprise decision makers and system architects.',
    images: ['/technical-specs-og.png'],
  },
};

interface TechnicalSpecsLayoutProps {
  children: React.ReactNode;
}

export default function TechnicalSpecsLayout({ children }: TechnicalSpecsLayoutProps) {
  return children;
}